1324980515.5919028

468101214161820222426

Insitu Temperature (˚C)

0 5 10 15 20 25 30 35 40 Salinity (PSU)

2021222324252627282930

22.5 23 23.5 24 24.5 25 25.5

26

26.5

0 40 80 120 160 200 240 280 320 360 400

Optode Oxygen Concentration (μm/kg)

Float 5375 (All profiles as of 27 Dec 2011)