1318065308.0388276

0100200300400500600700800900

1000

1100

Pressure (decibar)

30 31 32 33 34 35 36 Salinity (PSU)

-5 0 5 10 15 20 25 30

Insitu Temperature (˚C)

0 100 200 300 400

Optode Oxygen Concentration (μm/kg)

0 50 100 150 200 250 300 350

FLNTU Chlorophyl channel (counts)

0 40 80 120 160 200

FLNTU Backscatter channel (counts)

Float: 2768 Profile: 234 Location: -11.6˚S 79.7˚W Date: 08/13/2009

0102030

Insitu Temperature (˚C)

30.0 32.5 35.0 37.5

Salinity (PSU)