1329991719.5919028

051015202530354045505560

Insitu Temperature (˚C)

0 10 20 30 40 50 60

Salinity (PSU)

202122232425262728293031323334353637383940

2020.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27 27.5 28 28.5 29 29.5 30 30.5 31 31.5 32 32.5

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

0 40 80 120 160 200 240 280 320 360 400

Optode Oxygen Concentration (μm/kg)

Float 2767 (All profiles as of 23 Feb 2012)