1318065093.5919028

2.55.07.510.012.515.017.520.022.525.027.5

Insitu Temperature (˚C)

0 10 20 30 40 50 Salinity (PSU)

20212223242526272829303132333435363738

27 27.5 28 28.5 29 29.5 30 30.5 31

31.5

32

22 22.5 23 23.5 24 24.5 25 25.5

26

26.5

27

0 40 80 120 160 200 240 280 320 360 400

Optode Oxygen Concentration (μm/kg)

Float 2701 (All profiles as of 08 Oct 2011)