1320832946.5919028

10.012.515.017.520.022.525.027.530.032.535.037.5

Insitu Temperature (˚C)

35.5 36.0 36.5 37.0 37.5 38.0 38.5 39.0 39.5 Salinity (PSU)

28 29 30

Float 2620 (All profiles as of 09 Nov 2011)