1259834565.0388276

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

36.8 37.2 37.6 38.0 38.4 38.8 39.2 39.6 Salinity (PSU)

10 11 12 13 14 15 16 17

Insitu Temperature (˚C)

Float: 2041 Profile: 150 Location: 32.3˚N 26.1˚E Date: 12/02/2009

10.012.515.017.5

Insitu Temperature (˚C)

36 38 40

Salinity (PSU)