1324116147.5919028

11.75

12.00

12.25

12.50

12.75

13.00

13.25

13.50

13.75

14.00

14.25

14.50

Insitu Temperature (˚C)

35.5 36.0 36.5 37.0 37.5 38.0 38.5 39.0 39.5 Salinity (PSU)

Float 2014 (All profiles as of 17 Dec 2011)