1240353044.0054580

120.8˚ 121.2˚ 121.6˚ 122˚ 122.4˚

20.25˚

20.5˚

20.75˚

21˚

21.25˚

21.5˚

Float 6080 (As of 21 Apr 2009) : Most Recent Location of Float.