1240353073.5919028

26

21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26

26.5

27 0.02.55.07.510.012.515.017.520.022.525.027.530.0

Insitu Temperature (˚C)

33.6 33.8 34.0 34.2 34.4 34.6 34.8 35.0 Salinity (PSU)

60 80 100 120 140 160 180 200

O_2 Concentration (μm/kg)

Float 6080 (All profiles as of 21 Apr 2009)