1183192361.0388276

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 Salinity (PSU)

-5 0 5 10 15 20 25 30

Insitu Temperature (˚C)

Float: 2749 Profile: 040 Location: 20.8˚N 138.2˚E Date: 06/29/2007

0102030

Insitu Temperature (˚C)

32 34 36

Salinity (PSU)