1470731586.5919028

0481216202428323640

Insitu Temperature (˚C)

0 10 20 30 40 50

Salinity (PSU)

20212223242526272829303132333435363738

22.5 23 23.5 24 24.5 25 25.5 26 26.5 27 27.5 28 28.5 29 29.5 30 30.5 31 31.5 32

32.5

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5

27

Float 1541 (All profiles as of 09 Aug 2016)