1094805279.0388276

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 Salinity (PSU)

-5 0 5 10 15 20 25 30

Insitu Temperature (˚C)

Float: 1144 Profile: 057 Location: 14.0˚N 125.3˚E Date: 09/08/2004

0102030

Insitu Temperature (˚C)

32 34 36

Salinity (PSU)