1240353078.9026100

Surface Pressure for Float 6080

-0.404

-0.402

-0.400

-0.398

-0.396

-0.394

Surface Pressure (decibars)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

As of 21 Apr 2009