1240353075.5147060

Time Series of High Pressure Pump Time (Float 6080)

2186.0

2186.4

2186.8

2187.2

2187.6

2188.0

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0 Profile Number

As of 21 Apr 2009