1107768832.5147060

Time Series of High Pressure Pump Time (Float 1144)

960 1000

1040

1080

1120

1160

1200

1240

Pumping Time (seconds)

0 10 20 30 40 50 60 70 80 Profile Number

As of 07 Feb 2005