1321822872.5919028

22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

27.5

28

28 28.5 29

051015202530

Insitu Temperature (˚C)

34.8 35.2 35.6 36.0 36.4 36.8 37.2 Salinity (PSU)

125 150 175 200 225 250 275

Oxygen Concentration (μm/kg)

Float 2726 (All profiles as of 20 Nov 2011)