1467850410.5919028

04812162024283236404448

Insitu Temperature (˚C)

0 10 20 30 40 Salinity (PSU)

2021222324252627282930

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

Float 2884 (All profiles as of 06 Jul 2016)