1459211014.5919028

0481216202428323640444852

Insitu Temperature (˚C)

34 35 36 37 38 39 40 Salinity (PSU)

27 28 29 30

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

Float 1800 (All profiles as of 28 Mar 2016)