1070023690.5919028

13.514.014.515.015.516.016.517.017.518.018.519.019.520.020.521.021.5

Insitu Temperature (˚C)

38.4 38.5 38.6 38.7 38.8 38.9 39.0 39.1 Salinity (PSU)

Float 1504 (All profiles as of 28 Nov 2003)