1106743250.5919028

81012141618202224262830

Insitu Temperature (˚C)

32 33 34 35 36 37 38 39 40 Salinity (PSU)

25 26 27 28 29 30

21 21.5 22 22.5 23 23.5 24 24.5 25

25.5

26

Float 1073 (All profiles as of 26 Jan 2005)