1039350931.5919028

12141618202224262830

Insitu Temperature (˚C)

37.0 37.5 38.0 38.5 39.0 39.5 40.0 40.5 41.0 Salinity (PSU)

26 26.5 27 27.5 28 28.5 29 29.5 30

30.5

Float 0704 (All profiles as of 08 Dec 2002)