1137626791.5919028

510152025303540455055

Insitu Temperature (˚C)

0 5 10 15 20 25 30 35 40 Salinity (PSU)

2021222324252627282930

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5

Float 0672 (All profiles as of 18 Jan 2006)