1141868130.5919028

1314151617181920212223242526272829

Insitu Temperature (˚C)

5 10 15 20 25 30 35 40 Salinity (PSU)

21.5 22

22.5

23

23.5

24

24.5

25

25.5

Float 0627 (All profiles as of 08 Mar 2006)