1137626739.5919028

2021222324252627282930313233

Insitu Temperature (˚C)

36.5 37.0 37.5 38.0 38.5 39.0 39.5 40.0 40.5 41.0 Salinity (PSU)

25

25.5

26

26.5

27

27.5

28

28.5

Float 0352 (All profiles as of 18 Jan 2006)