1137626735.5919028

21.021.522.022.523.023.524.024.525.025.526.026.527.027.528.028.5

Insitu Temperature (˚C)

40.2 40.3 40.4 40.5 40.6 40.7 Salinity (PSU)

26.5

27

27.5

28

28.5

Float 0351 (All profiles as of 18 Jan 2006)