1027803514.5919028

04812162024283236

Insitu Temperature (˚C)

30.0 32.5 35.0 37.5 40.0 42.5 45.0 Salinity (PSU)

24 25 26 27 28 29 30 31 32 33 34

24 24.5 25 25.5 26 26.5 27 27.5 28 28.5 29 29.5 30 30.5 31 31.5 32

32.5

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5

27

Float 0350 (All profiles as of 27 Jul 2002)