1298299184.0388276

0200400600800

1000

1200

1400

1600

Pressure (decibar)

17 18 19 20 21 22 23 Salinity (PSU)

4 8 12 16 20 24 28

Insitu Temperature (˚C)

Float: 2619 Profile: 150 Location: 42.2˚N 38.8˚E Date: 06/03/2009

0510152025

Insitu Temperature (˚C)

15.0 17.5 20.0 22.5 25.0

Salinity (PSU)