1235245261.5919028

46810121416182022242628

Insitu Temperature (˚C)

0 4 8 12 16 20 24 Salinity (PSU)

1515.51616.51717.518

10.5 11 11.5 12 12.5 13 13.5

14

14.5

15

Float 1325 (All profiles as of 21 Feb 2009)