1235245066.5919028

4812162024283236404448

Insitu Temperature (˚C)

0 5 10 15 20 25 Salinity (PSU)

1515.51616.51717.51818.519

3 3.5 4 4.5 5 5.5 6 6.5 7 7.5 8 8.5 9 9.5 10 10.5 11 11.5 12 12.5 13 13.5 14 14.5

15

Float 0634 (All profiles as of 21 Feb 2009)