1235244813.5919028

468101214161820222426

Insitu Temperature (˚C)

17 18 19 20 21 22 23 Salinity (PSU)

15 15.5 16 16.5 17 17.5

11.5 12 12.5 13 13.5

14

14.5

15

Float 0587 (All profiles as of 21 Feb 2009)