889551179.6042292

Tentative Profiling Drifter Deployment Region With 0/300 dbar Dynamic Ht.

130˚E 135˚E 140˚E

35˚N

40˚N

45˚N

20

25

25

25

30

30

35

35

40

40

45

50

55

60

65

70

75

80

85

90

Number of Instruments: 40 Number of Profiles Per Instrument: 150 Parameters Measured: T, S, p, O_2 Sampling Interval: 5-10 days Profiling Interval: 0-1000 m