1041336210.5919028

0.02.55.07.510.012.515.017.520.022.525.027.5

Insitu Temperature (˚C)

32.0 32.5 33.0 33.5 34.0 34.5 35.0 Salinity (PSU)

25 25.5 26 26.5

Float 233 (All profiles as of 31 Dec 2002)