989721369.0388276

0100200300400500600700800900

1000

1100

1200

Pressure (decibar)

32.0 32.5 33.0 33.5 34.0 34.5 35.0 Salinity (PSU)

-10 0 10 20 30 40

Insitu Temperature (˚C)

Float: 229 Profile: 064 Location: 42.2˚N 135.9˚E Date: 12/10/2000

0510152025

Insitu Temperature (˚C)

32 33 34 35

Salinity (PSU)