1048561250.0388276

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32.5 33.0 33.5 34.0 34.5 35.0 Salinity (PSU)

0.0 2.5 5.0 7.5 10.0 12.5 15.0

Insitu Temperature (˚C)

Note: Simulated profiles. These are not actual hydrographic data.

Float: 006 Profile: 0170 Location: 53.5˚S 176.0˚W Date: 03/25/2003 Hour: 2.014

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)