1575992945.5919028

-2024681012141618

Insitu Temperature (˚C)

32 32 32 33 34 34 34 35 Salinity (PSU)

24.5 25 25.5 26 26.5

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

Float 9049 (All profiles as of 10 Dec 2019)