1461240178.0388276

0.00200.00

400.00

600.00

800.00

1000.00

1200.00

1400.00

1600.00

1800.00

Pressure (decibar)

30.00 31.00 32.00 33.00 34.00 35.00

Salinity (PSU)

-5.00 0.00 5.00 10.00 15.00 20.00

Insitu Temperature (˚C)

0.00 100.00 200.00 300.00 400.00

Optode Oxygen Concentration (μm/kg)

-1.00-0.50 0.00 0.50

ΔT= T^{Opt} - T^{SBE} (˚C)

Float: 6404 Profile: 197 Location: 39.9˚N 154.6˚E Date: 04/20/2016

0.005.0010.00

15.00

20.00

25.00

30.00

35.00

Insitu Temperature (˚C)

32.0033.0034.0035.0036.0037.0038.00

Salinity (PSU)