1036074416.5919028

-20246810121416

Insitu Temperature (˚C)

0 10 20 30 40 50 60 Salinity (PSU)

2020.52121.52222.52323.52424.52525.52626.52727.52828.52929.530

Float 0657 (All profiles as of 31 Oct 2002)