972043195.5919028

051015202530

T (˚C)

35.0 35.5 36.0 36.5 37.0 37.5 S (PSU)

27.5 28.0

23.5

24.0

24.5

25.0

25.5

26.0

26.5

27.0

PALACE 125 02/14/98 - 10/15/00 (91 profiles) WOA94 Comparison

32.5˚ - 40.9˚N 57.3˚ - 76.2˚W N=5941

1 SD of PALACE 125 1 SD of WOA94 WOA94 historical data PALACE 125 data