989810349.8978100

0100200300400500600700800900

1000

1100

1200

1300

Pressure (decibar)

0 5 10 15 20 25 30 35 Insitu Temperature (˚C)

Float: 027 Profile: 056

Location: 24.0˚N 58.4˚W Date: 03/19/1999