989797333.8978100

0100200300400500600700800900

1000

1100

1200

1300

Pressure (decibar)

0 5 10 15 20 25 30 35 Insitu Temperature (˚C)

Float: 002 Profile: 038

Location: 27.0˚N 58.8˚W Date: 09/06/1998