1092654582.4068404

0 1 2 3

4

10 11 13

14 16 17 1819

2021 22 23 24 26

27 28 29 63 79

8081 82 84 85 86 87 88 89

90 91 92

93 94

95 96

97

98 99 104 105 106 107 108 109 110 111 112 113114115

116117

118 119 120 121 122 125126 186 191 193215 216 220221 228

As of 16 Aug 2004 Deployment Locations for ALACE Floats.