2468101214161820222426

Insitu Temperature (˚C)

32 36 40 44 48 52 56 Salinity (PSU)

2525.52626.52727.52828.52929.53030.53131.53232.5333.53434.535

22.5 23 23.5 24 24.5 25 25.5

26

26.5

27

23.5 24 24.5 25 25.5 26 26.5

27

27.5

Float 8041 (All profiles as of 02 Jan 2023)