04812162024283236

Insitu Temperature (˚C)

33.50 33.75 34.00 34.25 34.50 34.75 35.00 Salinity (PSU)

27 27.5 28

26 26.5

19 19.5 20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5

27

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27 27.5

28

Float 7378 (All profiles as of 08 Apr 2019)