12345678910111213141516

Insitu Temperature (˚C)

33.0 33.5 34.0 34.5 35.0 35.5 36.0 Salinity (PSU)

25.5 26 26.5 27 27.5

25

25.5

26

26.5

27

26

26.5

27

27.5

28

Float 7212 (All profiles as of 04 Oct 2018)