1436358898.5919028

2468101214161820

Insitu Temperature (˚C)

33.9 34.0 34.1 34.2 34.3 34.4 34.5 34.6 34.7

Salinity (PSU)

26.5

24.5

25

25.5

26

26.5

27

Float 7165 (All profiles as of 08 Jul 2015)