1467547010.5919028

89101112131415161718192021222324

Insitu Temperature (˚C)

31 32 33 34 35 36 37 Salinity (PSU)

24 24.5 25 25.5 26 26.5 27 27.5 28 28.5

23

23.5

24

24.5

25

25.5

26

24

24.5

25

25.5

26

26.5

27

Float 6488 (All profiles as of 03 Jul 2016)