-2.0-1.6-1.2-0.8-0.40.00.40.81.21.6

Insitu Temperature (˚C)

-5 0 5 10 15 20 25 30 35 Salinity (PSU)

1515.51616.51717.51818.51919.52020.52121.52222.52323.52424.52525.52626.52727.528

Float 6397 (All profiles as of 19 Mar 2017)