1408327511.5919028

3.453.503.553.603.653.703.753.803.853.903.954.004.054.104.15

Insitu Temperature (˚C)

34.902 34.903 34.904 34.905 34.906 34.907 34.908 34.909 34.910

Salinity (PSU)

Float 6284 (All profiles as of 17 Aug 2014)