1427724123.5919028

-2.00

-1.75

-1.50

-1.25

-1.00

-0.75

-0.50

-0.25

0.000.250.500.751.001.25

Insitu Temperature (˚C)

33.25 33.50 33.75 34.00 34.25 34.50 34.75

Salinity (PSU)

27 27.5

Salinity (PSU)

Insitu Temperature (˚C)

33.25 33.50 33.75 34.00 34.25 34.50 34.75

Salinity (PSU)

Float 6096 (All profiles as of 30 Mar 2015)