123456789101112131415

Insitu Temperature (˚C)

33.50 33.75 34.00 34.25 34.50 34.75 35.00 35.25 Salinity (PSU)

26 26.5 27

25.5

26

26.5

27

26

26.5

27

27.5

28

Float 6008 (All profiles as of 03 Oct 2018)